3 3.5 4 4.5 5 5.5 6 6.5 7

0.975

0.98

0.985

0.99

0.995

1

1.005

n

Ratio of maximum free energy to the work function

Exponential histories

α_{max}=0.1, G_∞ =0.5 α_{max}=1.2, G_∞ =0.5 α_{max}=0.5, G_∞ =0.1 α_{max}=0.5, G_∞ =0.8