0 0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0.1

0.24

0.26

0.28

0.3

0.32

0.34

0.36

0.38

0.4

0.42

0.44

Time (withα=0.5, G_∞ = 0.1, n = 1)

Free energy/(G 0E12)

Exponential histories

Day free energy Graffi-Volterra free energy Work function