2 3 4 5 6 7 8 9 10 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

n

Average spacing and ratio

Plot of properties of theα_i

Average spacing of theα_i against n (forα_{max}=0.5) α_{min}/α_{max} against n